= Thread management
:idprefix:
:idseparator: -

This chapter describes how Apache ActiveMQ Artemis uses and pools threads and how you can manage them.

First we'll discuss how threads are managed and used on the server side, then we'll look at the client side.

== Server-Side Thread Management

Each Apache ActiveMQ Artemis Server maintains a single thread pool for general use, and a scheduled thread pool for scheduled use.
A Java scheduled thread pool cannot be configured to use a standard thread pool, otherwise we could use a single thread pool for both scheduled and non scheduled activity.

Apache ActiveMQ Artemis will, by default, cap its thread pool at three times the number of cores (or hyper-threads) as reported by `             Runtime.getRuntime().availableProcessors()`` for processing incoming packets.
To override this value, you can set the number of threads by specifying the parameter ``nioRemotingThreads` in the transport configuration.
See the xref:configuring-transports.adoc#configuring-the-transport[configuring transports] for more information on this.

There are also a small number of other places where threads are used directly, we'll discuss each in turn.

=== Server Scheduled Thread Pool

The server scheduled thread pool is used for most activities on the server side that require running periodically or with delays.
It maps internally to a `java.util.concurrent.ScheduledThreadPoolExecutor` instance.

The maximum number of thread used by this pool is configure in `broker.xml` with the `scheduled-thread-pool-max-size` parameter.
The default value is `5` threads.
A small number of threads is usually sufficient for this pool.

=== General Purpose Server Thread Pool

This general purpose thread pool is used for most asynchronous actions on the server side.
It maps internally to a `java.util.concurrent.ThreadPoolExecutor` instance.

The maximum number of thread used by this pool is configure in `broker.xml` with the `thread-pool-max-size` parameter.

If a value of `-1` is used this signifies that the thread pool has no upper bound and new threads will be created on demand if there are not enough threads available to satisfy a request.
If activity later subsides then threads are timed-out and closed.

If a value of `n` where ``n``is a positive integer greater than zero is used this signifies that the thread pool is bounded.
If more requests come in and there are no free threads in the pool and the pool is full then requests will block until a thread becomes available.
It is recommended that a bounded thread pool is used with caution since it can lead to dead-lock situations if the upper bound is chosen to be too low.

The default value for `thread-pool-max-size` is `30`.

See the https://docs.oracle.com/javase/8/docs/api/java/util/concurrent/ThreadPoolExecutor.html[J2SE javadoc] for more information on unbounded (cached), and bounded (fixed) thread pools.

=== Expiry Reaper Thread

A single thread is also used on the server side to scan for expired messages in queues.
We cannot use either of the thread pools for this since this thread needs to run at its own configurable priority.

For more information on configuring the reaper, please see xref:message-expiry.adoc#message-expiry[message expiry].

=== Asynchronous IO

Asynchronous IO has a thread pool for receiving and dispatching events out of the native layer.
You will find it on a thread dump with the prefix ActiveMQ-AIO-poller-pool.
Apache ActiveMQ Artemis uses one thread per opened file on the journal (there is usually one).

There is also a single thread used to invoke writes on libaio.
We do that to avoid context switching on libaio that would cause performance issues.
You will find this thread on a thread dump with the prefix ActiveMQ-AIO-writer-pool.

== Client-Side Thread Management

On the client side, Apache ActiveMQ Artemis maintains a single, "global" static scheduled thread pool and a single, "global" static general thread pool for use by all clients using the same classloader in that JVM instance.

The static scheduled thread pool has a maximum size of `5` threads by default.
This can be changed using the `scheduledThreadPoolMaxSize` URI parameter.

The general purpose thread pool has an unbounded maximum size.
This is changed using the `threadPoolMaxSize` URL parameter.

If required Apache ActiveMQ Artemis can also be configured so that each `ClientSessionFactory` instance does not use these "global" static pools but instead maintains its own scheduled and general purpose pool.
Any sessions created from that `ClientSessionFactory` will use those pools instead.
This is configured using the `useGlobalPools` boolean URL parameter.
