[[watcher-limitations]]
== Watcher Limitations

[float]
=== Watches Are Not Updated When File Based Scripts Change

When you refer to a file script in a watch, the watch itself is not updated
if you change the script on the filesystem.

Currently, the only way to reload a file script in a watch is to delete 
the watch and recreate it.
