[[indices-recovery]]
== Indices Recovery

The indices recovery API provides insight into on-going index shard recoveries.
Recovery status may be reported for specific indices, or cluster-wide.

For example, the following command would show recovery information for the indices "index1" and "index2".

[source,js]
--------------------------------------------------
GET index1,index2/_recovery?human
--------------------------------------------------
// CONSOLE
// TEST[s/^/PUT index1\nPUT index2\n/]

To see cluster-wide recovery status simply leave out the index names.

//////////////////////////

Here we create a repository and snapshot index1 in
order to restore it right after and prints out the
indices recovery result.

[source,js]
--------------------------------------------------
# create the index
PUT index1?include_type_name=true
{"settings": {"index.number_of_shards": 1}}

# create the repository
PUT /_snapshot/my_repository
{"type": "fs","settings": {"location": "recovery_asciidoc" }}

# snapshot the index
PUT /_snapshot/my_repository/snap_1?wait_for_completion=true

# delete the index
DELETE index1

# and restore the snapshot
POST /_snapshot/my_repository/snap_1/_restore?wait_for_completion=true

--------------------------------------------------
// CONSOLE

[source,js]
--------------------------------------------------
{
  "snapshot": {
    "snapshot": "snap_1",
    "indices": [
      "index1"
    ],
    "shards": {
      "total": 1,
      "failed": 0,
      "successful": 1
    }
  }
}
--------------------------------------------------
// TESTRESPONSE

//////////////////////////

[source,js]
--------------------------------------------------
GET /_recovery?human
--------------------------------------------------
// CONSOLE
// TEST[continued]

Response:
[source,js]
--------------------------------------------------
{
  "index1" : {
    "shards" : [ {
      "id" : 0,
      "type" : "SNAPSHOT",
      "stage" : "INDEX",
      "primary" : true,
      "start_time" : "2014-02-24T12:15:59.716",
      "start_time_in_millis": 1393244159716,
      "stop_time" : "0s",
      "stop_time_in_millis" : 0,
      "total_time" : "2.9m",
      "total_time_in_millis" : 175576,
      "source" : {
        "repository" : "my_repository",
        "snapshot" : "my_snapshot",
        "index" : "index1",
        "version" : "{version}",
        "restoreUUID": "PDh1ZAOaRbiGIVtCvZOMww"
      },
      "target" : {
        "id" : "ryqJ5lO5S4-lSFbGntkEkg",
        "host" : "my.fqdn",
        "transport_address" : "my.fqdn",
        "ip" : "10.0.1.7",
        "name" : "my_es_node"
      },
      "index" : {
        "size" : {
          "total" : "75.4mb",
          "total_in_bytes" : 79063092,
          "reused" : "0b",
          "reused_in_bytes" : 0,
          "recovered" : "65.7mb",
          "recovered_in_bytes" : 68891939,
          "percent" : "87.1%"
        },
        "files" : {
          "total" : 73,
          "reused" : 0,
          "recovered" : 69,
          "percent" : "94.5%"
        },
        "total_time" : "0s",
        "total_time_in_millis" : 0,
        "source_throttle_time" : "0s",
        "source_throttle_time_in_millis" : 0,
        "target_throttle_time" : "0s",
        "target_throttle_time_in_millis" : 0
      },
      "translog" : {
        "recovered" : 0,
        "total" : 0,
        "percent" : "100.0%",
        "total_on_start" : 0,
        "total_time" : "0s",
        "total_time_in_millis" : 0,
      },
      "verify_index" : {
        "check_index_time" : "0s",
        "check_index_time_in_millis" : 0,
        "total_time" : "0s",
        "total_time_in_millis" : 0
      }
    } ]
  }
}
--------------------------------------------------
// TESTRESPONSE[s/: (\-)?[0-9]+/: $body.$_path/]
// TESTRESPONSE[s/: "[^"]*"/: $body.$_path/]
////
The TESTRESPONSE above replace all the fields values by the expected ones in the test,
because we don't really care about the field values but we want to check the fields names.
////

The above response shows a single index recovering a single shard. In this case, the source of the recovery is a snapshot repository
and the target of the recovery is the node with name "my_es_node".

Additionally, the output shows the number and percent of files recovered, as well as the number and percent of bytes recovered.

In some cases a higher level of detail may be preferable. Setting "detailed=true" will present a list of physical files in recovery.

[source,js]
--------------------------------------------------
GET _recovery?human&detailed=true
--------------------------------------------------
// CONSOLE
// TEST[s/^/PUT index1\n{"settings": {"index.number_of_shards": 1}}\n/]

Response:

[source,js]
--------------------------------------------------
{
  "index1" : {
    "shards" : [ {
      "id" : 0,
      "type" : "STORE",
      "stage" : "DONE",
      "primary" : true,
      "start_time" : "2014-02-24T12:38:06.349",
      "start_time_in_millis" : "1393245486349",
      "stop_time" : "2014-02-24T12:38:08.464",
      "stop_time_in_millis" : "1393245488464",
      "total_time" : "2.1s",
      "total_time_in_millis" : 2115,
      "source" : {
        "id" : "RGMdRc-yQWWKIBM4DGvwqQ",
        "host" : "my.fqdn",
        "transport_address" : "my.fqdn",
        "ip" : "10.0.1.7",
        "name" : "my_es_node"
      },
      "target" : {
        "id" : "RGMdRc-yQWWKIBM4DGvwqQ",
        "host" : "my.fqdn",
        "transport_address" : "my.fqdn",
        "ip" : "10.0.1.7",
        "name" : "my_es_node"
      },
      "index" : {
        "size" : {
          "total" : "24.7mb",
          "total_in_bytes" : 26001617,
          "reused" : "24.7mb",
          "reused_in_bytes" : 26001617,
          "recovered" : "0b",
          "recovered_in_bytes" : 0,
          "percent" : "100.0%"
        },
        "files" : {
          "total" : 26,
          "reused" : 26,
          "recovered" : 0,
          "percent" : "100.0%",
          "details" : [ {
            "name" : "segments.gen",
            "length" : 20,
            "recovered" : 20
          }, {
            "name" : "_0.cfs",
            "length" : 135306,
            "recovered" : 135306
          }, {
            "name" : "segments_2",
            "length" : 251,
            "recovered" : 251
          }
          ]
        },
        "total_time" : "2ms",
        "total_time_in_millis" : 2,
        "source_throttle_time" : "0s",
        "source_throttle_time_in_millis" : 0,
        "target_throttle_time" : "0s",
        "target_throttle_time_in_millis" : 0
      },
      "translog" : {
        "recovered" : 71,
        "total" : 0,
        "percent" : "100.0%",
        "total_on_start" : 0,
        "total_time" : "2.0s",
        "total_time_in_millis" : 2025
      },
      "verify_index" : {
        "check_index_time" : 0,
        "check_index_time_in_millis" : 0,
        "total_time" : "88ms",
        "total_time_in_millis" : 88
      }
    } ]
  }
}
--------------------------------------------------
// TESTRESPONSE[s/"source" : \{[^}]*\}/"source" : $body.$_path/]
// TESTRESPONSE[s/"details" : \[[^\]]*\]//]
// TESTRESPONSE[s/: (\-)?[0-9]+/: $body.$_path/]
// TESTRESPONSE[s/: "[^"]*"/: $body.$_path/]
////
The TESTRESPONSE above replace all the fields values by the expected ones in the test,
because we don't really care about the field values but we want to check the fields names.
It also removes the "details" part which is important in this doc but really hard to test.
////

This response shows a detailed listing (truncated for brevity) of the actual files recovered and their sizes.

Also shown are the timings in milliseconds of the various stages of recovery: index retrieval, translog replay, and index start time.

Note that the above listing indicates that the recovery is in stage "done". All recoveries, whether on-going or complete, are kept in
cluster state and may be reported on at any time. Setting "active_only=true" will cause only on-going recoveries to be reported.

Here is a complete list of options:

[horizontal]
`detailed`::        Display a detailed view. This is primarily useful for viewing the recovery of physical index files. Default: false.
`active_only`::     Display only those recoveries that are currently on-going. Default: false.

Description of output fields:

[horizontal]
`id`::              Shard ID
`type`::            Recovery type:
                        * store
                        * snapshot
                        * replica
                        * relocating
`stage`::           Recovery stage:
                        * init:     Recovery has not started
                        * index:    Reading index meta-data and copying bytes from source to destination
                        * start:    Starting the engine; opening the index for use
                        * translog: Replaying transaction log
                        * finalize: Cleanup
                        * done:     Complete
`primary`::         True if shard is primary, false otherwise
`start_time`::      Timestamp of recovery start
`stop_time`::       Timestamp of recovery finish
`total_time_in_millis`::    Total time to recover shard in milliseconds
`source`::          Recovery source:
                        * repository description if recovery is from a snapshot
                        * description of source node otherwise
`target`::          Destination node
`index`::           Statistics about physical index recovery
`translog`::        Statistics about translog recovery
`start`::           Statistics about time to open and start the index
