[[analysis-stop-analyzer]]
=== Stop Analyzer

An analyzer of type `stop` that is built using a
<<analysis-lowercase-tokenizer,Lower
Case Tokenizer>>, with
<<analysis-stop-tokenfilter,Stop
Token Filter>>.

The following are settings that can be set for a `stop` analyzer type:

[cols="<,<",options="header",]
|=======================================================================
|Setting |Description
|`stopwords` |A list of stopwords to initialize the stop filter with.
Defaults to the english stop words.

|`stopwords_path` |A path (either relative to `config` location, or
absolute) to a stopwords file configuration.
|=======================================================================

