[role="xpack"]
[[configuring-monitoring]]
== Configuring Monitoring in {es}
++++
<titleabbrev>Configuring Monitoring</titleabbrev>
++++

{monitoring} is enabled by default when you install {xpack}. Advanced monitoring
settings enable you to control how frequently data is collected, configure
timeouts, and set the retention period for locally-stored monitoring indices. You
can also adjust how monitoring data is displayed. For more information, see
<<es-monitoring>>.

include::indices.asciidoc[]
include::{xes-repo-dir}/settings/monitoring-settings.asciidoc[]
