[role="xpack"]
[testenv="basic"]
[[ilm-get-status]]
=== Get {ilm} status API

[subs="attributes"]
++++
<titleabbrev>Get {ilm} status</titleabbrev>
++++

Retrieves the current {ilm} ({ilm-init}) status.

==== Request

`GET /_ilm/status`

==== Description

Returns the status of the {ilm-init} plugin. The `operation_mode` field in the
response shows one of three states: `STARTED`, `STOPPING`,
or `STOPPED`. You can change the status of the {ilm-init} plugin with the
<<ilm-start, Start ILM>> and <<ilm-stop, Stop ILM>> APIs.

==== Request Parameters

include::{docdir}/rest-api/common-parms.asciidoc[tag=timeoutparms]

==== Authorization

You must have the `manage_ilm` or `read_ilm` or both cluster privileges to use this API.
For more information, see {stack-ov}/security-privileges.html[Security Privileges].

==== Examples

The following example gets the {ilm-init} plugin status.

[source,console]
--------------------------------------------------
GET _ilm/status
--------------------------------------------------

If the request succeeds, the body of the response shows the operation mode:

[source,console-result]
--------------------------------------------------
{
  "operation_mode": "RUNNING"
}
--------------------------------------------------
