<!-- Code generated from the comments of the WinRM struct in helper/communicator/config.go; DO NOT EDIT MANUALLY -->

-   `winrm_username` (string) - The username to use to connect to WinRM.
    
-   `winrm_password` (string) - The password to use to connect to WinRM.
    
-   `winrm_host` (string) - The address for WinRM to connect to.
    
    NOTE: If using an Amazon EBS builder, you can specify the interface
    WinRM connects to via
    [`ssh_interface`](/docs/builders/amazon-ebs#ssh_interface)
    
-   `winrm_no_proxy` (bool) - Setting this to `true` adds the remote
    `host:port` to the `NO_PROXY` environment variable. This has the effect of
    bypassing any configured proxies when connecting to the remote host.
    Default to `false`.
    
-   `winrm_port` (int) - The WinRM port to connect to. This defaults to `5985` for plain
    unencrypted connection and `5986` for SSL when `winrm_use_ssl` is set to
    true.
    
-   `winrm_timeout` (duration string | ex: "1h5m2s") - The amount of time to wait for WinRM to become available. This defaults
    to `30m` since setting up a Windows machine generally takes a long time.
    
-   `winrm_use_ssl` (bool) - If `true`, use HTTPS for WinRM.
    
-   `winrm_insecure` (bool) - If `true`, do not check server certificate chain and host name.
    
-   `winrm_use_ntlm` (bool) - If `true`, NTLMv2 authentication (with session security) will be used
    for WinRM, rather than default (basic authentication), removing the
    requirement for basic authentication to be enabled within the target
    guest. Further reading for remote connection authentication can be found
    [here](https://msdn.microsoft.com/en-us/library/aa384295(v=vs.85).aspx).
    