<!-- Code generated from the comments of the RunConfig struct in builder/vmware/common/run_config.go; DO NOT EDIT MANUALLY -->

-   `headless` (bool) - Packer defaults to building VMware virtual machines
    by launching a GUI that shows the console of the machine being built. When
    this value is set to true, the machine will start without a console. For
    VMware machines, Packer will output VNC connection information in case you
    need to connect to the console to debug the build process.
    Some users have experienced issues where Packer cannot properly connect
    to a VM if it is headless; this appears to be a result of not ever having
    launched the VMWare GUI and accepting the evaluation license, or
    supplying a real license. If you experience this, launching VMWare and
    accepting the license should resolve your problem.
    
-   `vnc_bind_address` (string) - The IP address that should be
    binded to for VNC. By default packer will use 127.0.0.1 for this. If you
    wish to bind to all interfaces use 0.0.0.0.
    
-   `vnc_port_min` (int) - The minimum and maximum port
    to use for VNC access to the virtual machine. The builder uses VNC to type
    the initial boot_command. Because Packer generally runs in parallel,
    Packer uses a randomly chosen port in this range that appears available. By
    default this is 5900 to 6000. The minimum and maximum ports are
    inclusive.
    
-   `vnc_port_max` (int) - VNC Port Max
-   `vnc_disable_password` (bool) - Don't auto-generate a VNC password that
    is used to secure the VNC communication with the VM. This must be set to
    true if building on ESXi 6.5 and 6.7 with VNC enabled. Defaults to
    false.
    