<!-- Code generated from the comments of the CloudConfig struct in builder/yandex/common_config.go; DO NOT EDIT MANUALLY -->

- `folder_id` (string) - The folder ID that will be used to launch instances and store images.
  Alternatively you may set value by environment variable `YC_FOLDER_ID`.
  To use a different folder for looking up the source image or saving the target image to
  check options 'source_image_folder_id' and 'target_image_folder_id'.
