<!-- Code generated from the comments of the CommonConfig struct in builder/yandex/common_config.go; DO NOT EDIT MANUALLY -->

- `serial_log_file` (string) - File path to save serial port output of the launched instance.

- `state_timeout` (duration string | ex: "1h5m2s") - The time to wait for instance state changes.
  Defaults to `5m`.
