<!-- Code generated from the comments of the DiskConfig struct in builder/yandex/common_config.go; DO NOT EDIT MANUALLY -->

- `disk_name` (string) - The name of the disk, if unset the instance name
  will be used.

- `disk_size_gb` (int) - The size of the disk in GB. This defaults to 10/100GB.

- `disk_type` (string) - Specify disk type for the launched instance. Defaults to `network-ssd`.

- `disk_labels` (map[string]string) - Key/value pair labels to apply to the disk.

<!-- End of code generated from the comments of the DiskConfig struct in builder/yandex/common_config.go; -->
