<!-- Code generated from the comments of the VaultAWSEngineOptions struct in builder/amazon/common/access_config.go; DO NOT EDIT MANUALLY -->

- `name` (string) - Name

- `role_arn` (string) - Role ARN

- `ttl` (string) - Specifies the TTL for the use of the STS token. This
  is specified as a string with a duration suffix. Valid only when
  credential_type is assumed_role or federation_token. When not
  specified, the default_sts_ttl set for the role will be used. If that
  is also not set, then the default value of 3600s will be used. AWS
  places limits on the maximum TTL allowed. See the AWS documentation on
  the DurationSeconds parameter for AssumeRole (for assumed_role
  credential types) and GetFederationToken (for federation_token
  credential types) for more details.

- `engine_name` (string) - Engine Name
