<!-- Code generated from the comments of the BootConfigWrapper struct in builder/vmware/common/boot_config.go; DO NOT EDIT MANUALLY -->

- `usb_keyboard` (bool) - If set to true, Packer will use USB HID Keyboard scan codes to send the boot command to the VM and
  the [disable_vnc](#disable_vnc) option will be ignored and automatically set to true.
  This option is not supported by hosts with free license.
  
  ~> **Note:** The ESXi 6.5+ removes support to VNC. In this case, the `usb_keyboard` should be set to true
  in order to send boot command keystrokes to the VM.
