<!-- Code generated from the comments of the RunConfig struct in builder/vmware/common/run_config.go; DO NOT EDIT MANUALLY -->

~> **Note:** If [usb_keyboard](#usb_keyboard) is set to true, any VNC configuration will be ignored.
