<!-- Code generated from the comments of the GlobalRoutingSettings struct in builder/vsphere/clone/step_customize.go; DO NOT EDIT MANUALLY -->

- `ipv4_gateway` (string) - The IPv4 default gateway when using network_interface customization on the virtual machine.

- `ipv6_gateway` (string) - The IPv6 default gateway when using network_interface customization on the virtual machine.
