<!-- Code generated from the comments of the AccessConfig struct in builder/yandex/access_config.go; DO NOT EDIT MANUALLY -->

- `endpoint` (string) - Non standard API endpoint. Default is `api.cloud.yandex.net:443`.

- `service_account_key_file` (string) - Path to file with Service Account key in json format. This
  is an alternative method to authenticate to Yandex.Cloud. Alternatively you may set environment variable
  `YC_SERVICE_ACCOUNT_KEY_FILE`.

- `max_retries` (int) - The maximum number of times an API request is being executed.
