<!-- Code generated from the comments of the Config struct in post-processor/alicloud-import/post-processor.go; DO NOT EDIT MANUALLY -->

- `oss_bucket_name` (string) - The name of the OSS bucket where the RAW or VHD file will be copied to
  for import. If the Bucket doesn't exist, the post-process will create it for
  you.

- `image_os_type` (string) - Type of the OS, like linux/windows

- `image_platform` (string) - Platform such as `CentOS`

- `image_architecture` (string) - Platform type of the image system: `i386` or `x86_64`

- `format` (string) - The format of the image for import, now alicloud only support RAW and
  VHD.

<!-- End of code generated from the comments of the Config struct in post-processor/alicloud-import/post-processor.go; -->
