<!-- Code generated from the comments of the ISOConfig struct in common/iso_config.go; DO NOT EDIT MANUALLY -->

- `iso_checksum` (string) - The checksum for the ISO file or virtual hard drive file. The algorithm
  to use when computing the checksum can be optionally specified with
  `iso_checksum_type`. When `iso_checksum_type` is not set packer will
  guess the checksumming type based on `iso_checksum` length.
  `iso_checksum` can be also be a file or an URL, in which case
  `iso_checksum_type` must be set to `file`; the go-getter will download
  it and use the first hash found.

- `iso_url` (string) - A URL to the ISO containing the installation image or virtual hard drive
  (VHD or VHDX) file to clone.
