<!-- Code generated from the comments of the Config struct in builder/parallels/pvm/config.go; DO NOT EDIT MANUALLY -->

-   `skip_compaction` (bool) - Virtual disk image is compacted at the end of
    the build process using prl_disk_tool utility (except for the case that
    disk_type is set to plain). In certain rare cases, this might corrupt
    the resulting disk image. If you find this to be the case, you can disable
    compaction using this configuration value.
    
-   `vm_name` (string) - This is the name of the PVM directory for the new
    virtual machine, without the file extension. By default this is
    "packer-BUILDNAME", where "BUILDNAME" is the name of the build.
    
-   `reassign_mac` (bool) - If this is "false" the MAC address of the first
    NIC will reused when imported else a new MAC address will be generated
    by Parallels. Defaults to "false".
    