---
description: |
  The osc-bsuvolume Packer builder is like the BSU builder, but is intended to
  create BSU volumes rather than a machine image.
layout: docs
page_title: Outscale BSU Volume - Builders
sidebar_title: 'BSU Volume'
sidebar_current: docs-builders-osc-bsuvolume
---

# BSU Volume Builder

Type: `osc-bsuvolume`

The `osc-bsuvolume` Packer builder is able to create Ouscale Block Stogate Unit
volumes which are prepopulated with filesystems or data.

This builder builds BSU volumes by launching an Outscale VM from a source OMI,
provisioning that running machine, and then destroying the source machine,
keeping the volumes intact.

This is all done in your own Outscale account. The builder will create temporary key
pairs, security group rules, etc. that provide it temporary access to the
instance while the image is being created.

The builder does _not_ manage BSU Volumes. Once it creates volumes and stores
it in your account, it is up to you to use, delete, etc. the volumes.

-> **Note:** Temporary resources are, by default, all created with the
prefix `packer`. This can be useful if you want to restrict the security groups
and key pairs Packer is able to operate on.

## Configuration Reference

There are many configuration options available for the builder. They are
segmented below into two categories: required and optional parameters. Within
each category, the available configuration keys are alphabetized.

In addition to the options listed here, a
[communicator](/docs/templates/communicator.html) can be configured for this
builder.

### Required:

- `access_key` (string) - The access key used to communicate with OUTSCALE. [Learn how to set this](outscale.html#authentication)

- `vm_type` (string) - The Outscale VM type to use while building the OMI, such as `t2.small`.

- `region` (string) - The name of the region, such as `us-east-1`, in which to launch the Outscale VM to create the OMI.

- `secret_key` (string) - The secret key used to communicate with Outscale. [Learn how to set this](outscale.html#authentication)

- `source_omi` (string) - The initial OMI used as a base for the newly created machine. `source_omi_filter` may be used instead to populate this automatically.

### Optional:

- `ebs_volumes` (array of block device mappings) - Add the block device
  mappings to the OMI. The block device mappings allow for keys:

  - `device_name` (string) - The device name exposed to the VM (for example, `/dev/sdh` or `xvdh`). Required for every device in the block device mapping.

  - `delete_on_vm_deletion` (boolean) - Indicates whether the BSU volume is deleted on instance termination.
  - `iops` (number) - The number of I/O operations per second (IOPS) that the volume supports. See the documentation on
    [IOPs](https://wiki.outscale.net/display/EN/About+Volumes#AboutVolumes-VolumeTypesVolumeTypesandIOPS)
    for more information.

  - `no_device` (boolean) - Suppresses the specified device included in the block device mapping of the OMI.

  - `snapshot_id` (string) - The ID of the snapshot

  - `virtual_name` (string) - The virtual device name. See the documentation on [Block Device Mapping](https://wiki.outscale.net/display/EN/Defining+Block+Device+Mappings) for more information

  - `volume_size` (number) - The size of the volume, in GiB. Required if not specifying a `snapshot_id`

  - `volume_type` (string) - The volume type. `gp2` for General Purpose (SSD) volumes, `io1` for Provisioned IOPS (SSD) volumes, and `standard` for Magnetic volumes

  - `tags` (map) - Tags to apply to the volume. These are retained after
    the builder completes. This is a [template
    engine](/docs/templates/engine.html), see [Build template
    data](#build-template-data) for more information.

- `associate_public_ip_address` (boolean) - If using a non-default Net, public IP addresses are not provided by default. If this is toggled, your new VM will get a Public IP.

- `subregion_name` (string) - Destination subregion to launch VM in. Leave this empty to allow Outscale to auto-assign.

- `custom_endpoint_oapi` (string) - This option is useful if you use a cloud
  provider whose API is compatible with Outscale OAPI. Specify another endpoint
  like this `outscale.com/oapi/latest`.

- `disable_stop_vm` (boolean) - Packer normally stops the build
  VM after all provisioners have run. For Windows VMs, it is
  sometimes desirable to [run Sysprep](<https://docs.microsoft.com/en-us/previous-versions/windows/it-pro/windows-vista/cc721940(v=ws.10)>) which will stop the VM for you. If this is set to `true`, Packer
  _will not_ stop the VM but will assume that you will send the stop
  signal yourself through your final provisioner. You can do this with a
  [windows-shell provisioner](https://www.packer.io/docs/provisioners/windows-shell.html).

  Note that Packer will still wait for the VM to be stopped, and
  failing to send the stop signal yourself, when you have set this flag to
  `true`, will cause a timeout.

- `bsu_optimized` (boolean) - If true, the VM is created with optimized BSU I/O.

- `insecure_skip_tls_verify` (boolean) - This allows skipping TLS
  verification of the OAPI endpoint. The default is `false`.

- `run_tags` (object of key/value strings) - Tags to apply to the instance
  that is _launched_ to create the OMI. These tags are _not_ applied to the
  resulting OMI unless they're duplicated in `tags`. This is a [template
  engine](/docs/templates/engine.html), see [Build template
  data](#build-template-data) for more information.

- `security_group_id` (string) - The ID (_not_ the name) of the security
  group to assign to the VM. By default this is not set and Packer will
  automatically create a new temporary security group to allow SSH access.
  Note that if this is specified, you must be sure the security group allows
  access to the `ssh_port` given below.

- `security_group_ids` (array of strings) - A list of security groups as
  described above. Note that if this is specified, you must omit the
  `security_group_id`.

- `shutdown_behavior` (string) - Automatically terminate instances on
  shutdown in case Packer exits ungracefully. Possible values are `stop` and
  `terminate`. Defaults to `stop`.

- `shutdown_behavior` (string) - Automatically terminate VMs on
  shutdown in case Packer exits ungracefully. Possible values are "stop" and
  "terminate", default is `stop`.

- `snapshot_groups` (array of strings) - A list of groups that have access to
  create volumes from the snapshot(s). By default no groups have permission
  to create volumes from the snapshot(s). `all` will make the snapshot
  publicly accessible.

- `snapshot_users` (array of strings) - A list of account IDs that have
  access to create volumes from the snapshot(s). By default no additional
  users other than the user creating the OMIS has permissions to create
  volumes from the backing snapshot(s).

- `source_omi_filter` (object) - Filters used to populate the `source_omi` field.

  - `filters` (map of strings) - filters used to select a `source_omi`.
  - `owners` (array of strings) - Filters the images by their owner. You may specify one or more Outscale account IDs, "self" (which will use the account whose credentials you are using to run Packer). This option is required for security reasons.

    Example:

    ```json
    {
      "source_omi_filter": {
        "filters": {
          "virtualization-type": "hvm",
          "image-name": "ubuntu/images/*ubuntu-xenial-16.04-amd64-server-*",
          "root-device-type": "ebs"
        },
        "owners": ["099720109477"]
      }
    }
    ```

    This selects an Ubuntu 16.04 HVM BSU OMIS from Canonical. NOTE:
    This will fail unless _exactly_ one OMIS is returned. In the above example,
    `most_recent` will cause this to succeed by selecting the newest image.

- `ssh_keypair_name` (string) - If specified, this is the key that will be used for SSH with the machine. The key must match a key pair name loaded up into Outscale. By default, this is blank, and Packer will generate a temporary keypair unless [`ssh_password`](../templates/communicator.html#ssh_password) is used. [`ssh_private_key_file`](../templates/communicator.html#ssh_private_key_file) or `ssh_agent_auth` must be specified when `ssh_keypair_name` is utilized.

- `ssh_interface` (string) - One of `public_ip`, `private_ip`, `public_dns`, or `private_dns`. If set, either the public IP address, private IP address, public DNS name or private DNS name will used as the host for SSH. The default behaviour if inside a Net is to use the public IP address if available, otherwise the private IP address will be used. If not in a Net the public DNS name will be used. Also works for WinRM.

  Where Packer is configured for an outbound proxy but WinRM traffic should be direct, `ssh_interface` must be set to `private_dns` and `<region>.compute.internal` included in the `NO_PROXY` environment variable.

- `subnet_id` (string) - If using Net, the ID of the subnet, such as `subnet-12345def`, where Packer will launch the VM. This field is required if you are using an non-default Net.

- `temporary_key_pair_name` (string) - The name of the temporary key pair to generate. By default, Packer generates a name that looks like `packer_<UUID>`, where &lt;UUID&gt; is a 36 character unique identifier.

- `temporary_security_group_source_cidr` (string) - An IPv4 CIDR block to be authorized access to the VM, when packer is creating a temporary security group. The default is `0.0.0.0/0` (i.e., allow any IPv4 source). This is only used when `security_group_id` or `security_group_ids` is not specified.

- `user_data` (string) - User data to apply when launching the VM. Note that you need to be careful about escaping characters due to the templates being JSON. It is often more convenient to use `user_data_file`, instead. Packer will not automatically wait for a user script to finish before shutting down the VM this must be handled in a provisioner.

- `user_data_file` (string) - Path to a file that will be used for the user data when launching the VM.

- `net_id` (string) - If launching into a Net subnet, Packer needs the Net ID in order to create a temporary security group within the Net. Requires `subnet_id` to be set. If this field is left blank, Packer will try to get the Net ID from the `subnet_id`.

- `net_filter` (object) - Filters used to populate the `net_id` field.
  Example:

  ```json
  {
    "net_filter": {
      "filters": {
        "is-default": "false",
        "ip-range": "/24"
      }
    }
  }
  ```

  This selects the Net with a IPv4 CIDR block of `/24`. NOTE: This will fail unless _exactly_ one Net is returned.

  - `filters` (map of strings) - filters used to select a `vpc_id`. NOTE: This will fail unless _exactly_ one Net is returned.

    `net_id` take precedence over this.

- `windows_password_timeout` (string) - The timeout for waiting for a Windows password for Windows VMs. Defaults to 20 minutes. Example value: `10m`

## Basic Example

```json
{
  "builders": [
    {
      "type": "osc-bsuvolume",
      "region": "eu-west-2",
      "vm_type": "t2.micro",
      "source_omi": "ami-65efcc11",
      "ssh_username": "outscale",
      "ebs_volumes": [
        {
          "volume_type": "gp2",
          "device_name": "/dev/xvdf",
          "delete_on_vm_deletion": false,
          "tags": {
            "zpool": "data",
            "Name": "Data1"
          },
          "volume_size": 10
        },
        {
          "volume_type": "gp2",
          "device_name": "/dev/xvdg",
          "tags": {
            "zpool": "data",
            "Name": "Data2"
          },
          "delete_on_vm_deletion": false,
          "volume_size": 10
        },
        {
          "volume_size": 10,
          "tags": {
            "Name": "Data3",
            "zpool": "data"
          },
          "delete_on_vm_deletion": false,
          "device_name": "/dev/xvdh",
          "volume_type": "gp2"
        }
      ]
    }
  ]
}
```

-> **Note:** Packer can also read the access key and secret access key from
environmental variables. See the configuration reference in the section above
for more information on what environmental variables Packer will look for.

Further information on locating OMI's IDs and their relationship to VM
types and regions can be found in the Outscale Documentation [reference](https://wiki.outscale.net/display/EN/Official+OMIs+Reference).

## Accessing the Instance to Debug

If you need to access the instance to debug for some reason, run the builder
with the `-debug` flag. In debug mode, the Amazon builder will save the private
key in the current directory and will output the DNS or IP information as well.
You can use this information to access the instance as it is running.

## Build template data

In configuration directives marked as a template engine above, the following
variables are available:

- `BuildRegion` - The region (for example `eu-west-2`) where Packer is
  building the OMI.
- `SourceOMI` - The source OMI ID (for example `ami-a2412fcd`) used to build
  the OMI.
- `SourceOMIName` - The source OMI Name (for example
  `ubuntu/images/ebs-ssd/ubuntu-xenial-16.04-amd64-server-20180306`) used to
  build the OMI.
- `SourceOMITags` - The source OMI Tags, as a `map[string]string` object.

-> **Note:** Packer uses pre-built OMIs as the source for building images.
These source OMIs may include volumes that are not flagged to be destroyed on
termination of the instance building the new image. In addition to those
volumes created by this builder, any volumes in the source OMI which are not
marked for deletion on termination will remain in your account.
