
-   `ssh_keypair_name` (string) - If specified, this is the key that will be used for SSH with the
    machine. The key must match a key pair name loaded up into the remote.
    By default, this is blank, and Packer will generate a temporary keypair
    unless [`ssh_password`](#ssh_password) is used.
    [`ssh_private_key_file`](#ssh_private_key_file) or
    [`ssh_agent_auth`](#ssh_agent_auth) must be specified when
    [`ssh_keypair_name`](#ssh_keypair_name) is utilized.

