<!-- Code generated from the comments of the Config struct in builder/googlecompute/config.go; DO NOT EDIT MANUALLY -->

- `account_file` (string) - The JSON file containing your account credentials. Not required if you
  run Packer on a GCE instance with a service account. Instructions for
  creating the file or using service accounts are above.

- `impersonate_service_account` (string) - This allows service account impersonation as per the [docs](https://cloud.google.com/iam/docs/impersonating-service-accounts).

- `accelerator_type` (string) - Full or partial URL of the guest accelerator type. GPU accelerators can
  only be used with `"on_host_maintenance": "TERMINATE"` option set.
  Example:
  `"projects/project_id/zones/europe-west1-b/acceleratorTypes/nvidia-tesla-k80"`

- `accelerator_count` (int64) - Number of guest accelerator cards to add to the launched instance.

- `address` (string) - The name of a pre-allocated static external IP address. Note, must be
  the name and not the actual IP address.

- `disable_default_service_account` (bool) - If true, the default service account will not be used if
  service_account_email is not specified. Set this value to true and omit
  service_account_email to provision a VM with no service account.

- `disk_name` (string) - The name of the disk, if unset the instance name will be used.

- `disk_size` (int64) - The size of the disk in GB. This defaults to 10, which is 10GB.

- `disk_type` (string) - Type of disk used to back your instance, like pd-ssd or pd-standard.
  Defaults to pd-standard.

- `enable_secure_boot` (bool) - Create a Shielded VM image with Secure Boot enabled. It helps ensure that
  the system only runs authentic software by verifying the digital signature
  of all boot components, and halting the boot process if signature verification
  fails. [Details](https://cloud.google.com/security/shielded-cloud/shielded-vm)

- `enable_vtpm` (bool) - Create a Shielded VM image with virtual trusted platform module
  Measured Boot enabled. A vTPM is a virtualized trusted platform module,
  which is a specialized computer chip you can use to protect objects,
  like keys and certificates, that you use to authenticate access to your
  system. [Details](https://cloud.google.com/security/shielded-cloud/shielded-vm)

- `enable_integrity_monitoring` (bool) - Integrity monitoring helps you understand and make decisions about the
  state of your VM instances. Note: integrity monitoring relies on having
  vTPM enabled. [Details](https://cloud.google.com/security/shielded-cloud/shielded-vm)

- `skip_create_image` (bool) - Skip creating the image. Useful for setting to `true` during a build test stage. Defaults to `false`.

- `image_name` (string) - The unique name of the resulting image. Defaults to
  `packer-{{timestamp}}`.

- `image_description` (string) - The description of the resulting image.

- `image_encryption_key` (\*CustomerEncryptionKey) - Image encryption key to apply to the created image. Possible values:
  * kmsKeyName -  The name of the encryption key that is stored in Google Cloud KMS.
  * RawKey: - A 256-bit customer-supplied encryption key, encodes in RFC 4648 base64.
  
  example:
  
   ```json
   {
      "kmsKeyName": "projects/${project}/locations/${region}/keyRings/computeEngine/cryptoKeys/computeEngine/cryptoKeyVersions/4"
   }
   ```

- `image_family` (string) - The name of the image family to which the resulting image belongs. You
  can create disks by specifying an image family instead of a specific
  image name. The image family always returns its latest image that is not
  deprecated.

- `image_labels` (map[string]string) - Key/value pair labels to apply to the created image.

- `image_licenses` ([]string) - Licenses to apply to the created image.

- `image_storage_locations` ([]string) - Storage location, either regional or multi-regional, where snapshot
  content is to be stored and only accepts 1 value. Always defaults to a nearby regional or multi-regional
  location.
  
  multi-regional example:
  
   ```json
   {
      "image_storage_locations": ["us"]
   }
   ```
  regional example:
  
   ```json
   {
      "image_storage_locations": ["us-east1"]
   }
   ```

- `instance_name` (string) - A name to give the launched instance. Beware that this must be unique.
  Defaults to `packer-{{uuid}}`.

- `labels` (map[string]string) - Key/value pair labels to apply to the launched instance.

- `machine_type` (string) - The machine type. Defaults to "n1-standard-1".

- `metadata` (map[string]string) - Metadata applied to the launched instance.
  All metadata configuration values are expected to be of type string.
  Google metadata options that take a value of `TRUE` or `FALSE` should be
  set as a string (i.e  `"TRUE"` `"FALSE"` or `"true"` `"false"`).

- `metadata_files` (map[string]string) - Metadata applied to the launched instance. Values are files.

- `min_cpu_platform` (string) - A Minimum CPU Platform for VM Instance. Availability and default CPU
  platforms vary across zones, based on the hardware available in each GCP
  zone.
  [Details](https://cloud.google.com/compute/docs/instances/specify-min-cpu-platform)

- `network` (string) - The Google Compute network id or URL to use for the launched instance.
  Defaults to "default". If the value is not a URL, it will be
  interpolated to
  `projects/((network_project_id))/global/networks/((network))`. This value
  is not required if a subnet is specified.

- `network_project_id` (string) - The project ID for the network and subnetwork to use for launched
  instance. Defaults to project_id.

- `omit_external_ip` (bool) - If true, the instance will not have an external IP. use_internal_ip must
  be true if this property is true.

- `on_host_maintenance` (string) - Sets Host Maintenance Option. Valid choices are `MIGRATE` and
  `TERMINATE`. Please see [GCE Instance Scheduling
  Options](https://cloud.google.com/compute/docs/instances/setting-instance-scheduling-options),
  as not all machine\_types support `MIGRATE` (i.e. machines with GPUs).
  If preemptible is true this can only be `TERMINATE`. If preemptible is
  false, it defaults to `MIGRATE`

- `preemptible` (bool) - If true, launch a preemptible instance.

- `state_timeout` (duration string | ex: "1h5m2s") - The time to wait for instance state changes. Defaults to "5m".

- `region` (string) - The region in which to launch the instance. Defaults to the region
  hosting the specified zone.

- `scopes` ([]string) - The service account scopes for launched
  instance. Defaults to:
  
  ```json
  [
    "https://www.googleapis.com/auth/userinfo.email",
    "https://www.googleapis.com/auth/compute",
    "https://www.googleapis.com/auth/devstorage.full_control"
  ]
  ```

- `service_account_email` (string) - The service account to be used for launched instance. Defaults to the
  project's default service account unless disable_default_service_account
  is true.

- `source_image_project_id` ([]string) - A list of project IDs to search for the source image. Packer will search the first
  project ID in the list first, and fall back to the next in the list, until it finds the source image.

- `startup_script_file` (string) - The path to a startup script to run on the launched instance from which the image will
  be made. When set, the contents of the startup script file will be added to the instance metadata
  under the `"startup_script"` metadata property. See [Providing startup script contents directly](https://cloud.google.com/compute/docs/startupscript#providing_startup_script_contents_directly) for more details.
  
  When using `startup_script_file` the following rules apply:
  - The contents of the script file will overwrite the value of the `"startup_script"` metadata property at runtime.
  - The contents of the script file will be wrapped in Packer's startup script wrapper, unless `wrap_startup_script` is disabled. See `wrap_startup_script` for more details.
  - Not supported by Windows instances. See [Startup Scripts for Windows](https://cloud.google.com/compute/docs/startupscript#providing_a_startup_script_for_windows_instances) for more details.

- `wrap_startup_script` (boolean) - For backwards compatibility this option defaults to `"true"` in the future it will default to `"false"`.
  If "true", the contents of `startup_script_file` or `"startup_script"` in the instance metadata
  is wrapped in a Packer specific script that tracks the execution and completion of the provided
  startup script. The wrapper ensures that the builder will not continue until the startup script has been executed.
  - The use of the wrapped script file requires that the user or service account
  running the build has the compute.instance.Metadata role.

- `subnetwork` (string) - The Google Compute subnetwork id or URL to use for the launched
  instance. Only required if the network has been created with custom
  subnetting. Note, the region of the subnetwork must match the region or
  zone in which the VM is launched. If the value is not a URL, it will be
  interpolated to
  `projects/((network_project_id))/regions/((region))/subnetworks/((subnetwork))`

- `tags` ([]string) - Assign network tags to apply firewall rules to VM instance.

- `use_internal_ip` (bool) - If true, use the instance's internal IP instead of its external IP
  during building.

- `use_os_login` (bool) - If true, OSLogin will be used to manage SSH access to the compute instance by
  dynamically importing a temporary SSH key to the Google account's login profile,
  and setting the `enable-oslogin` to `TRUE` in the instance metadata.
  Optionally, `use_os_login` can be used with an existing `ssh_username` and `ssh_private_key_file`
  if a SSH key has already been added to the Google account's login profile - See [Adding SSH Keys](https://cloud.google.com/compute/docs/instances/managing-instance-access#add_oslogin_keys).
  
  SSH keys can be added to an individual user account
  
  ```shell-session
  $ gcloud compute os-login ssh-keys add --key-file=/home/user/.ssh/my-key.pub
  
  $ gcloud compute os-login describe-profile
  PosixAccounts:
  - accountId: <project-id>
   gid: '34567890754'
   homeDirectory: /home/user_example_com
   ...
   primary: true
   uid: '2504818925'
   username: /home/user_example_com
  sshPublicKeys:
   000000000000000000000000000000000000000000000000000000000000000a:
     fingerprint: 000000000000000000000000000000000000000000000000000000000000000a
  ```
  
  Or SSH keys can be added to an associated service account
  ```shell-session
  $ gcloud auth activate-service-account --key-file=<path to service account credentials file (e.g account.json)>
  $ gcloud compute os-login ssh-keys add --key-file=/home/user/.ssh/my-key.pub
  
  $ gcloud compute os-login describe-profile
  PosixAccounts:
  - accountId: <project-id>
   gid: '34567890754'
   homeDirectory: /home/sa_000000000000000000000
   ...
   primary: true
   uid: '2504818925'
   username: sa_000000000000000000000
  sshPublicKeys:
   000000000000000000000000000000000000000000000000000000000000000a:
     fingerprint: 000000000000000000000000000000000000000000000000000000000000000a
  ```

- `vault_gcp_oauth_engine` (string) - Can be set instead of account_file. If set, this builder will use
  HashiCorp Vault to generate an Oauth token for authenticating against
  Google Cloud. The value should be the path of the token generator
  within vault.
  For information on how to configure your Vault + GCP engine to produce
  Oauth tokens, see https://www.vaultproject.io/docs/auth/gcp
  You must have the environment variables VAULT_ADDR and VAULT_TOKEN set,
  along with any other relevant variables for accessing your vault
  instance. For more information, see the Vault docs:
  https://www.vaultproject.io/docs/commands/#environment-variables
  Example:`"vault_gcp_oauth_engine": "gcp/token/my-project-editor",`
